I'm glad I called you today and was able to make i...

I'm glad I called you today and was able to make it to the viewing. That's so sad. Todd's mom kept holding on to me when I would hug her. It was so sad.<BR/>I remember visiting him the first time in the nursing home with Janice and playing Rummy with him and visiting him at the hospital while you all were in Australia. I was glad to have such good times with him, and it's really sad that he's