Sorry to hear about Grandpa Alvin. He was fortuna...

Sorry to hear about Grandpa Alvin. He was fortunate to have family always around him and a loving 4 legged visitor (Brewster). Luckily he never knew about the cancer and more importantly, he did not suffer with pain.<BR/><BR/>How sweet that Brewster loved visiting there so much. He knew a good thing and an inviting lap.<BR/><BR/>I am sorry for your loss.